0 0.5 1 1.5 2 2.5 3 )c (GeV/ Tp

4−10

3−10

2−10

1−10

1

-1)c (GeV/

Tp/d N d N1/

= 5.02 TeV NNs Pb − ALICE, Pb

-1bμ 13 ± = 533 intL

UPC, 2c < 3.35 GeV/ μμm 2.85 <

| < 4 y 2.5 < | 0n0n ψ Coherent J/ ψ Incoherent J/ with nucleon dissociation ψ Incoherent J/ ’ decay ψ from ψ Coherent J/ ’ decay ψ from ψ Incoherent J/ μμ→γγ Continuum =1.35 dof /^2χ

Fit:

ALI-PUB-567123

ALI-PUB-567123